Precision Measurement of J/ψ Leptonic Branching Fraction — answers to the referees

Chang Zheng Yuan e-mail: Yuancz@bepc5.ihep.ac.cn

November, 1996

2

3

4

5

Figure 1: p_‘+ vesus p_‘�.

Figure 2: angular distributions of π+π�ℓ+ℓ�, histogram for Monte Carlo and error bars for data.

Figure 3: SC energy of electrons, comparison between data and Monte Carlo, black line for data and blue line for Monte Carlo.

Figure 4: Branching fractions vary when cuts changed.

Figure 5: recoil mass distribution of process I and process II, (a) process I; (b) process II.