0 50 100 150

110 120 130 140 150

Data events per 2 m (thousands)

π^+π^− Data MC (a) 0.98 1 1.02

110 120 130 140 150

Slope = (−1.60 Α 0.63) Ξ10^{−4}

π^+π^−

Normalized data/MC ratio

(b)

0

1000

2000

πeν 0.98 1 1.02

Slope = (−0.53 Α 0.34) Ξ10^{−4}

πeν

0

20

40 π^oπ^o 0.98 1 1.02

Slope = ( 0.90 Α 1.04) Ξ10^{−4}

π^oπ^o

0 200 400 600 800

Vertex Z (m)

3π^o 0.98 1 1.02

Slope = ( 0.14 Α 0.36) Ξ10^{−4}

3π^o

Vertex Z (m)