Q^2 (GeV^2) cross sections ratio

ZEUS96-97 (prelim.) ϕ/ρ ZEUS94 ϕ/ρ

ZEUS96 (prelim.) ϕ/ρ H1 ϕ/ρ ZEUS93 ω/ρ

ZEUS96-97 (prelim.) ω/ρ

0

0.1

0.2

0.3

0 5 10 15 20