m_{γγ} (GeV)

0 0.1 0.2 0.3 0.4 0.5

Entries

0 500 1000

1500

2000

2500

3000

3500 π^0 Mass E_{γγ} > 500 MeV

BaBar

π^0-mass = 134.2 MeV π^0-width = 7.7 MeV