p*e ( Σ frame )

Kinematic Variables for Ξ 5 Σ^+ e^- ν ( Dots = DATA, Histo = MC )

0 25 50 75 100

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

p*v_{TR}( Σ-e Frame ) 0 20 40 60 80

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

e*v_{TR}( Σ-e Frame ) 0 20 40 60 80

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1