CLEO, 1998

L3, 1997

PDG, 1996

CELLO, 1991

TPC, 1990

Parameter set b

Parameter set a

η^0

η

π^0

Two photon decay widths of π^0, η and η^0 mesons

Q^2[GeV^2]

Γ(Q^2)[eV]

20 18 16 14 12 10 8 6 4 2 0

10000

1000

100

10

1

0.1

0.01

0.001