0.4

0.6

0.8

1

1.2

1.4

0 0.2 0.4 0.6 0.8 1 rescaled angle (ϕ_{resc})

1/N_{evt} dn/dϕ(A+B)/(C+D)

189 GeV particle flow (detector level)

All clusters

No CR SK I GH L3 data