10^2

10^3

10^4

0 0.5 1 1.5 2 2.5 3

Background Subtracted + Acceptance Corrected Data Fit τ = 0.506Α0.008(stat) ps Acceptance Corrected Sideband

Reduced Proper Time (ps)

Corrected Events/50 fs