0 1000

2000

3000

4000

5000

0.975 1 1.025 1.05 M(K^+K^-) (GeV/c^2)

Events/1 MeV/c^2

0 25 50 75 100 125 150 175 200 225

-1 -0.5 0 0.5 1

Signal Region Sideband Region Accepted Region

cos(ϕ)

Events/0.02