0 200 400 600 800 1000

1200

1.5 2 2.5 M, GeV

N/0.1GeV

a)

0 1000

2000

3000

4000

5000

6000

7000

1.5 2 2.5 M, GeV

N/0.1GeV

b)

0 25 50 75 100 125 150 175 200

1.5 2 2.5 M, GeV degrees

c)