Bπ mass ΜGeV/c^2Ν

N / 40 MeV/c^2

OPAL preliminary a) B_J^* 5 B^*π^Α(π) decays only

Bπ mass ΜGeV/c^2Ν

N / 80 MeV/c^2

b) B_J^* 5 Bπ^Α(π) decays only

-500 0 500 1000

1500

2000

2500

3000

5.4 5.6 5.8 6 6.2 6.4 6.6 6.8 7 7.2

-1000

-500 0 500 1000

1500

2000

2500

3000

3500

5.4 5.6 5.8 6 6.2 6.4 6.6 6.8 7 7.2