-50 0 50 100 150 200 250 300

5.4 5.6 5.8 6 6.2 6.4

(a)

No. of entries / 25 MeV

Bπ mass (GeV)

OPAL data

-10 0 10 20 30 40 50

5.8 6 6.2 6.4 6.6

(b)

No. of entries / 25 MeV

BK mass (GeV)

OPAL data