JLab E94-010

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

900 1000 1100 1200 1300 1400 1500 1600 1700

3He Parallel and Perpendicular Asymmetries

PRELIMINARY RESULTS

W(MeV)

Asymmetries

E = 1.720 GeV θ = 15.5^°

A_{parallel} A_{perpendicular}