0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

0.06 0.08 0.1 0.12 0.14 0.16 0.18

α_S (M_Z^2)

EEC AEEC JCEF 1-Thr O C B_{Max} B_{Sum} ρ_H ρ_S ρ_D D_2^{E0} D_2^{P0} D_2^P D_2^{Jade} D_2^{Durham} D_2^{Geneva} D_2^{Cambridge}

w. average ϑ α_S(M_Z^2) = 0.1173 Α 0.0026 χ^2/n_{df} = 6.1 / 16 ρ_{eff} = 0.62

DELPHI

x_μ exp. opt. incl. m_b effects