0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

cos( p,S_Λ) ( Λ Frame )

Events / 0.067 ( Norm. to 1 )