Test #28 Chamber ME1.2.008

4 / 1 5 / 2 0 0 3 0 9 : 5 7

H V , V A L C T , k H z C L C T , k H z

3 1 0 0 0 . 0 0 1 0 . 0 0 0

3 2 0 0 0 . 0 0 8 0 . 0 0 0

3 2 5 0 0 . 0 2 0 0 . 0 0 1

3 3 0 0 0 . 0 4 6 0 . 0 0 4

3 3 5 0 0 . 0 7 6 0 . 0 1 0

3 4 0 0 0 . 0 9 9 0 . 0 2 0

3 4 5 0 0 . 1 0 1 0 . 0 2 7

3 5 0 0 0 . 1 0 6 0 . 0 3 4

3 5 5 0 0 . 1 1 1 0 . 0 3 5

3 6 0 0 0 . 1 0 9 0 . 0 3 6

3 6 5 0 0 . 1 1 2 0 . 0 3 6

3 7 0 0 0 . 1 1 1 0 . 0 3 6

3 7 5 0 0 . 1 1 2 0 . 0 3 6

3 8 0 0 0 . 1 1 3 0 . 0 3 6

A L C T a n d C L C T p l a t e a u v s . H V

C S C M E 1 . 2 . 0 0 8

0 . 0 0 0

0 . 0 2 0

0 . 0 4 0

0 . 0 6 0

0 . 0 8 0

0 . 1 0 0

0 . 1 2 0

3

1

0

0

3

2

0

0

3

2

5

0

3

3

0

0

3

3

5

0

3

4

0

0

3

4

5

0

3

5

0

0

3

5

5

0

3

6

0

0

3

6

5

0

3

7

0

0

3

7

5

0

3

8

0

0

H V v a l u e s , V

Hit rates, kHz

A L C T

C L C T