NHAD/NTOT VS IRUN 0

0.2

13750 13755 13760 13765 13770

NHAD/NBHA VS IRUN

10

15

13750 13755 13760 13765 13770

NDIMU/NBHA VS IRUN

0.25

0.5

13750 13755 13760 13765 13770

NHAD/NGOOD VS IRUN

0.8

1

13750 13755 13760 13765 13770

NEUTRAL/NTOT VS IRUN 0

0.005

0.01

13750 13755 13760 13765 13770

NEUTRAL/NGOOD VS IRUN 0

0.05

13750 13755 13760 13765 13770

N0PRG/NTOT VS IRUN 0 0.1 0.2 0.3 0.4

13750 13755 13760 13765 13770

N0PRG/NGE2PRG VS IRUN 0 0.2 0.4 0.6

13750 13755 13760 13765 13770

N2PRG/NTOT VS IRUN 0 0.2 0.4 0.6

13750 13755 13760 13765 13770

N2PRG/NGE2PRG VS IRUN 0.4 0.5 0.6 0.7 0.8

13750 13755 13760 13765 13770

N4PRG/NTOT VS IRUN 0 0.05 0.1 0.15

13750 13755 13760 13765 13770

N4PRG/NGE2PRG VS IRUN

0.05 0.1 0.15 0.2

13750 13755 13760 13765 13770

N6PRG/NTOT VS IRUN 0 0.02

0.04

0.06

13750 13755 13760 13765 13770

N6PRG/NGE2PRG VS IRUN

0.03

0.04

0.05

0.06

13750 13755 13760 13765 13770

NGT6PRG/NTOT VS IRUN 0 0.02

0.04

0.06

13750 13755 13760 13765 13770

NGT6PRG/NGE2PRG VS IRUN

0.01

0.02

0.03

0.04

0.05

13750 13755 13760 13765 13770